Centrefeed Wiper Dispenser Refill White Roll (Pack of 6)

Centrefeed Wiper Dispenser Refill White (Pack of 6)

The white centrefeed refill from Selco is a hygienic alternative to hand towels.

The centrefeed design means reduced wastage, with every sheet able to be used with or without the cardboard roll in the middle, which helps save you money. This centrefeed practical dispenser refill roll is great for all hand wiping and spill cleanup.

Packed 6 rolls per case

2ply embossed

140mt per roll

white hand towel roll – selco hygiene

The post Centrefeed Wiper Dispenser Refill White Roll (Pack of 6) appeared first on Cleaning and Hygiene Products.