Degradable Green Eco Clear Refuse Sack 26 x 44 –

Degradable Strong Clear Refuse Bag 26×44

These strong clear bin bags are Degradable and strong,

Perfect for everyday use or recycle stations,

Packed 200 bags per case.

Strong Degradable Bin Bags

Size 26″ x 44″

Size 66cm x 112cm

Degradable Clear Bin Bags at Selco.ie

The post Degradable Green Eco Clear Refuse Sack 26 x 44 – appeared first on Cleaning and Hygiene Products.