Professional Products Nutrabac Washing Up Liquid Bactericidal 5L

Nutrabac Neutral Cleaning Detergent

CaterSafe Cleaning Detergent Nutrabac

Suitable for use on all washable surfaces including ceramic tiles, vinyl, plastics, benches, equipment, stainless steel, aluminium, glass, walls and floors
Nutrabac is a general purpose cleaning detergent.
The No1 Cleaning Detergent,

The post Professional Products Nutrabac Washing Up Liquid Bactericidal 5L appeared first on Cleaning and Hygiene Products.