Healthcare Neutral Liquid Bactericidal Detergent- Nutrabac –

A powerful Nutrabac healthcare detergent for cleaning dishes and most hard surfaces.

Directions

Nutrabac Neutral Liquid Detergent Selco

This Nutrabac Dishwashing Neutral Detergent cuts through tough grease for sparkling crockery, cutlery and glassware. Also ideal for safe, general purpose cleaning on surfaces including plastic, wood and enamel, this concentrated formula can be diluted as needed for effective general cleaning.

For general cleaning: dilute 1 part with upto 160 parts of warm water depending on the amount of grease and soil to be removed. Place items in the bowl, allow to soak, then wipe with a cloth, sponge or brush. Drip dry and polish with a soft cloth.

Also suitable for mold and green algea removal of tarps and boat covers,

Packed  5 Litre

A Bactericidal detergent for the removal of bacteria.

Gives streak free drain drying of glassware and crockery.

Ideal for general wall and paintwork cleaning.

Controlled foam for damp mopping.

Dysys Best quality Cleaning Chemicals in Ireland

An odourless washing-up liquid for hand use. Cuts through grease and grime to leave a sparkling finish.

Contains effective bactericide

Dysys Chemicals

Neutral detergent features an effective, unperfumed formula that is safe for use in food handling and preparation areas. Though ideal for cleaning hard surfaces and washable materials, this liquid detergent is also biodegradable and can be used as a washing-up liquid as well. This means that you can use this one cleaning liquid to wash glassware, clothing, upholstery and much, much more.

Learn more…
• High-performance, versatile detergent ideal for washing hard surfaces
• This general-purpose cleaner detergent can also be used as a biodegradable washing-up liquid
• Suitable for use in areas where food handling and preparation is common
• Unperfumed & highly concentrated,

Multi-purpose cleaners, also known as all-purpose cleaners, and are a chemical cleaning product designed for use on multiple surfaces. By using a combination of chemicals that are commonly used for different appliances, these products are compatible for use on multiple surfaces and devices, The perfect all surface cleaner,

The post Healthcare Neutral Liquid Bactericidal Detergent- Nutrabac – appeared first on Cleaning and Hygiene Products.